---
title: Troubleshooting
description: Solutions to the most common Sencho setup and runtime problems.
---

## Containers won't start after deploy

**Symptom:** You click Deploy and containers immediately exit or never appear.

**Check:** Open the [Host Console](/features/host-console) and run:

```bash
docker compose -f /path/to/your/stack/compose.yaml logs
```

The most common causes:

- **Missing environment variable** - a required variable in your `.env` file is empty or has the wrong name.
- **Port already in use** - another container or host process is bound to the same port. Change the host port in the compose file.
- **Volume path does not exist** - a bind-mount path on the host doesn't exist yet. Create the directory manually.

---

## The 1:1 path rule - volumes resolve to wrong paths

**Symptom:** Stacks deploy but relative volume paths (e.g. `./config:/config`) point to the wrong location inside the container, or `docker compose` exits with a path error.

**Cause:** Your `COMPOSE_DIR` is mounted at a different path inside the Sencho container than it has on the host.

**Fix:** Your compose volume mount and `COMPOSE_DIR` environment variable must use the **same absolute path** on both sides:

```yaml
# docker-compose.yml for Sencho itself
volumes:
  - /opt/docker:/opt/docker        # same path inside and outside
environment:
  - COMPOSE_DIR=/opt/docker
```

See [Configuration - the 1:1 path rule](/getting-started/configuration#compose-directory-the-11-path-rule) for a full explanation.

---

## "Permission denied" on the Docker socket

**Symptom:** Sencho starts but shows errors accessing Docker, or the stack list is empty even though containers exist.

**Cause:** The Sencho container cannot read `/var/run/docker.sock`.

**Fix:** Ensure the socket is mounted:

```yaml
volumes:
  - /var/run/docker.sock:/var/run/docker.sock
```

On Linux, the Docker socket is owned by the `docker` group. The Sencho entrypoint detects the socket's GID automatically and adds the internal `sencho` user to the matching group. If you see permission errors despite a correct mount, check that the socket file is readable:

```bash
ls -la /var/run/docker.sock
# Expected: srw-rw---- 1 root docker ...
```

If the group is not `docker`, the auto-detection still works - Sencho reads the GID from the socket file at startup.

---

## "Permission denied" when deleting a stack

**Symptom:** Clicking Delete on a stack fails with a permission error mentioning `EACCES`.

**Cause:** Stack directories often contain files owned by root — for example when Docker Compose was run with `sudo`, or when containers write config/data files into the stack directory. Since Sencho runs as a non-root user, the OS denies the removal.

This is especially common when installing Sencho on a server where stacks were originally created outside of Sencho (e.g. via `sudo docker compose up`). Those directories and their contents are root-owned, but Sencho can still delete them.

**How Sencho handles it:** Sencho automatically detects permission errors during deletion and falls back to a Docker-based cleanup. It spawns a short-lived Alpine container that bind-mounts the stack directory and removes the root-owned files. This happens transparently — no manual intervention is needed in the standard Docker setup.

**If automatic cleanup fails:** The error message will include the directory path. Remove it manually:

```bash
sudo rm -rf /path/to/your/compose/dir/stack-name
```

**Prerequisites:** The Docker socket must be mounted (standard setup). If Sencho cannot access Docker, the fallback will not work — see [Permission denied on the Docker socket](#permission-denied-on-the-docker-socket).

---

## Login page shows "Something went wrong"

**Symptom:** You enter credentials and get a generic error instead of being logged in.

**Possible causes and fixes:**

| Cause | Fix |
|-------|-----|
| `JWT_SECRET` is not set or is empty | Set a non-empty value for `JWT_SECRET` in your environment |
| Container restarted and session cookie is stale | Clear browser cookies for the Sencho domain and try again |
| Rate limit triggered (5 failed attempts in 15 min) | Wait 15 minutes, or restart the container to reset the limiter |

---

## WebSocket connections fail (logs/console not streaming)

**Symptom:** The log viewer or host console shows a spinner that never resolves, or you see "Disconnected" immediately after connecting.

**Cause:** A reverse proxy is not forwarding WebSocket upgrade headers.

**Fix:** Add WebSocket support to your proxy config:

```nginx
# Nginx
proxy_http_version 1.1;
proxy_set_header Upgrade $http_upgrade;
proxy_set_header Connection "upgrade";
proxy_read_timeout 3600s;
```

Traefik handles WebSocket upgrades automatically for HTTP/1.1 backends - no extra config needed.

---

## Remote node shows "Offline" or "Unknown"

**Symptom:** A node you added shows a red or gray status dot.

**Checks in order:**

1. **Is the remote Sencho instance running?** SSH to that machine and verify.
2. **Is the API URL correct?** It must include the protocol and port (e.g. `http://192.168.1.20:3001`). Open it in a browser - you should see a JSON response from `/api/health`.
3. **Is the token correct?** Tokens are long JWT strings. Even one missing character will cause auth to fail. Regenerate the token on the remote instance and update the node config.
4. **Is there a firewall blocking the port?** The primary Sencho host must be able to reach the remote host's Sencho port.

Click the **wifi icon** on the node row to re-test connectivity after making changes.

---

## Forgotten admin password

Sencho has no password recovery flow. To reset the password:

1. Stop the Sencho container
2. Connect to the SQLite database directly:

```bash
sqlite3 /path/to/data/sencho.db
```

3. Delete the existing credentials so Sencho re-enters first-boot setup mode:

```sql
DELETE FROM global_settings WHERE key IN ('auth_username', 'auth_password_hash', 'auth_jwt_secret');
```

4. Restart the container - the setup screen will appear on next visit.

<Warning>
  This resets authentication entirely. All active sessions become invalid. Your stacks, nodes, and alert rules are not affected.
</Warning>

---

## Checking the health endpoint

Sencho exposes a health endpoint for monitoring and container health checks:

```bash
curl http://localhost:3000/api/health
# {"status":"ok","uptime":12345.67}
```

A `200` response confirms the backend is running. Use this endpoint in your uptime monitor or load balancer health check.

---

## Getting logs from the Sencho container itself

```bash
docker logs sencho
# or, to follow:
docker logs -f sencho
```

The backend logs all route errors and service failures to stdout. This is the first place to look when the UI shows an error with no useful message.
