---
title: Private Registries
sidebarTitle: Registries
description: Store credentials for private Docker registries so Sencho can authenticate automatically during deploy, pull, and image-update checks.
---

<Note>
  Private Registries is an admin-only feature. Credentials for Docker Hub, GitHub Container Registry (GHCR), and custom or self-hosted registries are available on every tier; AWS ECR requires a Sencho **Admiral** license. Each Sencho instance stores its own registry credentials; the Registries section is hidden when you are viewing another node through the node switcher.
</Note>

Sencho stores credentials for your private Docker registries and injects them automatically whenever it runs `docker compose pull` or `docker compose up`. Stacks can reference private images without anyone having to run `docker login` on the host.

<Frame>
  <img src="/images/private-registries/registries-overview.png" alt="Registries section in Settings showing one configured GHCR registry card with the global scope masthead stat" />
</Frame>

## Supported registry types

| Type | Description | Credentials |
|------|-------------|-------------|
| **Docker Hub** | Private Docker Hub organizations and repositories | Username + access token |
| **GitHub Container Registry (GHCR)** | `ghcr.io` images for users and organizations | GitHub username + personal access token (PAT) |
| **AWS Elastic Container Registry (ECR)** | Amazon ECR private registries (Admiral) | AWS Access Key ID + Secret Access Key (+ region) |
| **Custom / Self-hosted** | Any Docker V2 compatible registry | Username + password or token |

AWS ECR requires a Sencho **Admiral** license; Docker Hub, GHCR, and custom registries are available on every tier.



## Browse tags from Resources

When you inspect an image on the Resources page, the detail sheet includes a **Registry tags** section for admins. Sencho lists tags from the configured registry that matches the image host (credentials come from that registry row only). Tag browsing always runs on the hub instance; local image digests still come from the active node.

If credentials are wrong, Sencho reports a registry error without signing you out of the dashboard.

## Where to find it

Open **Settings → Infrastructure → Registries** on the Sencho instance you are signed into directly. The section is hidden when you are viewing another node through the node switcher.

## Adding a registry

1. Click **Add registry**. The form expands inline above the registry list.
2. Pick a **Registry Type**. The form rearranges to match: for ECR an **AWS Region** field appears and the credential fields are relabelled to **AWS Access Key ID** and **AWS Secret Access Key**; for GHCR the **Registry URL** is pre-filled with `ghcr.io`.
3. Enter a descriptive **Name**.
4. Enter the **Registry URL**. For Docker Hub the field is read-only and the canonical `https://index.docker.io/v1/` value is used automatically.
5. Enter the credentials (username + secret, or AWS keys for ECR).
6. For ECR, fill in the **AWS Region** (e.g., `us-east-1`).
7. Click **Test connection** to probe the registry before saving. For Docker, GHCR, and self-hosted registries this hits the `/v2/` endpoint; for ECR it calls AWS STS `GetAuthorizationToken`.
8. Click **Add** to store the credentials.

<Frame>
  <img src="/images/private-registries/registries-empty.png" alt="Empty Registries section with the Add registry button and the 'No private registries configured' callout" />
</Frame>

<Frame>
  <img src="/images/private-registries/registries-add-form.png" alt="Add registry form expanded with Registry Type set to Docker Hub, the Registry URL field locked to the canonical value, and credential fields below" />
</Frame>

## Managing registries

Each saved registry renders as a card:

<Frame>
  <img src="/images/private-registries/registries-card-detail.png" alt="Registry card showing a GHCR entry with type badge, URL, username, Secret stored pill, created date, and Test connection, Edit, and Delete icon buttons" />
</Frame>

The card surfaces:

- **Name** and **type badge** (`Docker Hub`, `GitHub (GHCR)`, `AWS ECR`, or `Custom`).
- **Registry URL** in a monospaced font.
- **Username**.
- **Secret stored** (or **No secret**) with a status icon.
- **Region**, when the registry is an ECR type.
- **Created** date.

Three icon actions sit on the right of the card:

- **Test connection** (checkmark icon) re-runs the live probe against the saved credentials.
- **Edit** (pencil icon) re-opens the form with the existing values. The **Secret / Token** field shows `(leave blank to keep current)` as its placeholder; type a new value only if you want to rotate the credential.
- **Delete** (trash icon) opens a destructive confirmation dialog.

<Frame>
  <img src="/images/private-registries/registries-delete-confirm.png" alt="Delete registry confirmation dialog warning that stacks using images from this registry will fail to pull until credentials are re-added" />
</Frame>

Deleting a registry removes the credential record immediately. Any stack that references images from that registry will start failing its pull step on the next deploy until you add the registry back.

### Testing connectivity

You can verify credentials at two points:

- **Before saving**, from the **Test connection** button inside the add or edit form. The probe runs against the values currently in the form and never persists them, so you can confirm a token or password works before committing it.
- **After saving**, from the **Test connection** icon on any registry card. Sencho decrypts the stored secret and re-runs the same probe.

For Docker Hub, GHCR, and self-hosted registries, the probe authenticates against `/v2/` with Basic auth and follows a token-endpoint redirect on a 401 `WWW-Authenticate` challenge. For ECR, the probe asks AWS for an authorization token and returns success once the call succeeds.

## How credentials are applied

### Deploy and pull operations

For every deploy or update Sencho:

1. Resolves credentials for every configured registry.
2. For ECR, reuses a cached authorization token when one is still valid; otherwise fetches a fresh one from AWS. Cached tokens are refreshed a few minutes before the AWS-reported expiry, so deploys do not fail on a borderline token.
3. Writes a temporary Docker config file containing all the resolved auth entries.
4. Sets the `DOCKER_CONFIG` environment variable so `docker compose` reads from the temporary config instead of the host's `~/.docker/config.json`.
5. Runs the compose operation (pull and/or up).
6. Deletes the temporary config immediately after the operation finishes.

Credentials are never persisted to disk on the host beyond the duration of a single operation.

If a stored secret cannot be decrypted at deploy time (for example because the encryption key file was replaced), Sencho skips that one registry, writes a warning to the deploy log stream prefixed with `[Sencho] Warning:`, and continues. Public-image deploys still succeed when one private registry is misconfigured, and the failure is visible so the operator can re-save the credentials.

### Image update checks

The background image-update checker uses the same stored credentials. When it polls a registry to compare local and remote digests for a private image, it authenticates with the registry-specific credentials configured here.

## ECR setup

AWS ECR uses short-lived authentication tokens (valid for 12 hours) derived from IAM credentials. Sencho handles the token lifecycle automatically:

1. Store the **AWS Access Key ID** and **Secret Access Key** as the credential pair.
2. Set the **AWS Region** where the registry lives.
3. On every deploy or pull, Sencho reuses a cached authorization token while it is valid, or calls the AWS `GetAuthorizationToken` API to obtain a fresh one.

<Frame>
  <img src="/images/private-registries/registries-ecr-form.png" alt="Add registry form with type set to AWS Elastic Container Registry (ECR), showing the relabelled AWS Access Key ID and AWS Secret Access Key inputs and the AWS Region field" />
</Frame>

<Warning>
  Use an IAM user or role limited to the ECR read permissions below. Do not paste root account credentials.
</Warning>

### IAM policy example

```json
{
  "Version": "2012-10-17",
  "Statement": [
    {
      "Effect": "Allow",
      "Action": [
        "ecr:GetAuthorizationToken",
        "ecr:BatchGetImage",
        "ecr:GetDownloadUrlForLayer",
        "ecr:BatchCheckLayerAvailability"
      ],
      "Resource": "*"
    }
  ]
}
```

## Registry URL reference

| Registry | URL to use |
|----------|-----------|
| Docker Hub | `https://index.docker.io/v1/` (set automatically) |
| GHCR | `ghcr.io` |
| AWS ECR | `{account_id}.dkr.ecr.{region}.amazonaws.com` |
| Self-hosted | Your registry hostname, e.g. `registry.example.com` |

## Security

- **Encrypted storage.** Registry secrets are encrypted at rest with the same encryption layer used for remote-node tokens and SSO secrets.
- **No persistent Docker login.** Credentials are written to a temporary file for the duration of each compose operation and deleted afterward.
- **Secrets never exposed.** The API never returns decrypted secrets. The UI shows only whether a secret is stored.
- **Admin role required.** Registry management is restricted to admin operators. Viewers and operators with non-admin roles cannot see the section.
- **API tokens cannot manage registries.** Registry credentials can only be created, edited, or deleted from an admin browser session. Automation tokens are scoped away from this surface so a leaked CI key cannot rewrite pull credentials.
- **Audit trail.** Registry create, update, and delete operations are recorded in the [Audit Log](/features/audit-log).

## Registries in a multi-node fleet

Registry credentials are stored on the Sencho instance where you enter them, and each instance resolves its own credentials at deploy time. Sencho does not automatically share credentials between instances: a remote node authenticates its pulls with the registries configured on that node, not with the ones on the instance you happen to be signed into.

Because the Registries section is hidden when you view another node through the node switcher, manage a remote node's registries by signing into that node's own Sencho instance directly. Configure each private registry on every instance that deploys images from it, so a stack keeps pulling no matter which node it runs on.

## Troubleshooting

<AccordionGroup>
  <Accordion title="Pull fails with a 401 even though the credentials saved successfully">
    The most common cause is a URL format mismatch. Use the values from the **Registry URL reference** table above. For Docker Hub the value is set automatically; for GHCR use `ghcr.io` exactly. If the URL is correct, open the registry, re-enter the secret, and click **Test connection** inside the form. Some providers rotate tokens silently, and the card view cannot tell you a stored token was revoked without an active probe.
  </Accordion>

  <Accordion title="An ECR registry works for a while and then stops pulling">
    AWS ECR authorization tokens are valid for 12 hours. Sencho caches the token in memory and refreshes it automatically a few minutes before the AWS-reported expiry, so no operator action is needed in steady state. If pulls still fail, confirm the IAM user still has `ecr:GetAuthorizationToken` and that the AWS Access Key ID has not been rotated. Click **Test connection** on the card to force a fresh token fetch.
  </Accordion>

  <Accordion title='The deploy log shows `[Sencho] Warning: Registry "X" credentials unavailable`'>
    Sencho could not decrypt the stored secret for that registry. The deploy continues without that registry's credentials, which is fine if the stack pulls only public images. To fix it, open the registry, re-enter the secret, and save. If the same warning appears for every registry at once, the encryption key file in your data directory has been replaced or lost and every stored secret needs to be re-entered.
  </Accordion>

  <Accordion title="Test connection says it failed but deploys still pull images successfully">
    Some registries, notably certain self-hosted mirrors and proxy caches, restrict access to the `/v2/` discovery endpoint while still allowing pulls. Sencho uses `/v2/` as the probe target, so a failure there does not always indicate broken credentials. If your deploys succeed, the test result can be ignored. The probe is a best-effort check, not a save-time gate.
  </Accordion>

  <Accordion title="The Registries section is not visible">
    The section is shown on the instance you are signed into directly, to operators with the admin role. On a remote node viewed through the node switcher, the section is hidden by design; sign into that node's own Sencho instance to manage its registries. If a non-admin operator should be able to manage registries, change their role under **Settings → Access → Users** first. Adding an **AWS ECR** registry requires Admiral; Docker Hub, GHCR, and custom registries are available on every tier.
  </Accordion>

  <Accordion title="A node displays a 'Private Registries is not available on this node' lock card">
    The selected node is on a Sencho version too old to surface this feature. Upgrade the node to a current Sencho release, then sign into that node's own Sencho instance to configure its registry credentials. Only the management UI depends on the node's version; once upgraded, that node's deploys use the registries configured on it.
  </Accordion>

  <Accordion title="An API token cannot create or update registries">
    Registry management is restricted to admin browser sessions; API tokens are not scoped for this surface. Use a signed-in browser for the create, edit, and delete flow and reserve API tokens for the operations they are designed for.
  </Accordion>
</AccordionGroup>
