---
title: Atomic Deployments
sidebarTitle: Atomic deploys
description: Wrap every deploy and update in a backup, a 3-second health probe, and an automatic rollback when a container crashes.
---

Sencho wraps every protected deploy in a four-step safety net: it backs up the current compose file, `.env`, and any configured project env files, runs the compose action, waits 3 seconds for containers to settle, then checks for a non-zero exit code. If any container crashed, Sencho restores the backup and re-deploys automatically.

The same backup also powers the **Rollback** action in the stack editor, so you can roll a stack back to its last good configuration on demand. To see in advance whether that rollback would actually help, and to watch container health for longer than the 3-second probe, see [Health-Gated Updates](/features/health-gated-updates).

## How it works

1. **Backup.** Before the action runs, Sencho copies `compose.yaml` (or `compose.yml` / `docker-compose.yaml` / `docker-compose.yml`), `.env` if present, and any project env files configured for the stack (for example, `stack.env` or `.env.production`) into the backup directory. The deploy progress modal streams `=== Backup created for atomic deployment ===` once the copy completes, before any `docker compose` output.
2. **Run the action.** Sencho executes the requested compose action: `up -d` for a deploy, or a pull-then-`up -d` recreate for an update.
3. **Health probe.** Sencho waits 3 seconds, then lists every container with the `com.docker.compose.project=<stack>` label and checks each one for a non-zero exit code. Any container that has exited with a non-zero status counts as a crash.
4. **Auto-rollback on failure.** When a crash is detected, Sencho streams `=== Deployment failed - restoring previous compose and env files ===`, restores the backed-up files, and re-runs `docker compose up -d` with the restored configuration. On success it streams `=== Restored previous compose and env files ===`. The restore reverts the compose and `.env` configuration. An image on a moving tag (such as `latest`) is not reverted, because the local tag still resolves to the newly pulled digest. The original deploy error is preserved as the deploy result, so a failed-then-rolled-back deploy still registers as a failure.

If the rollback itself fails (for example, the re-deploy step cannot pull a previously available image, or the file restore is blocked by filesystem permissions), Sencho streams `=== Rollback failed. Manual intervention may be required ===`. The backup files remain at `<DATA_DIR>/backups/<nodeId>/<stack>/` so you can copy them back manually.

## Which operations are protected

Atomic deployments wrap:

- **Deploy** and **Update** from the stack editor's action bar.
- **App Store** installs of a new stack.
- **Webhook** triggers for deploy and pull actions.
- **Image auto-updates** triggered by an auto-update policy.

A scheduled image-update task uses the same atomic wrapper as a manual update, so a recurring update still takes a backup and rolls back automatically when a container crashes. Scheduled lifecycle actions (start, stop, restart) change no stack configuration and run `docker compose` directly without a backup.

[Blueprint](/features/blueprint-model) deploys are a separate, fleet-wide desired-state path and do not use this atomic wrapper: a failed Blueprint apply is not backed up or rolled back automatically.

## Manual rollback

The stack editor's action bar has a **More actions** overflow menu (the three-dot icon next to **Update**). **Rollback** sits at the top, with the most recent backup's timestamp beneath the label. Selecting it restores the backed-up files and re-runs `docker compose up -d` non-atomically, so the rollback does not nest inside another atomic wrapper and overwrite the good backup with the just-failed state.

<Frame>
  <img src="/images/atomic-deployments/rollback-menu.png" alt="Stack editor header for the plex stack, with the More actions overflow menu open. Rollback sits at the top with the backup timestamp beneath the label, followed by Scan config, a Mute submenu for the stack's notifications, and Delete." />
</Frame>

The menu entry is hidden when no backup exists for the stack, for example on a freshly created stack that has never been deployed. It is also hidden for users who lack the `stack:deploy` permission; the backend enforces that check as the authoritative guard. The **Mute** entry next to it controls notification suppression for the stack and is unrelated to atomic deployments; see [Alerts & Notifications](/features/alerts-notifications).

After a failed deploy or update, the stack page also surfaces a **Roll back** button in the recovery panel alongside Retry, Restart, and Refresh. This is the same rollback action, triggered in response to a failure rather than invoked on demand. See [Deploy Progress](/features/deploy-progress#recovery-actions) for the full recovery actions reference.

## Where backups are stored

Backups live under `<DATA_DIR>/backups/<nodeId>/<stack>/`, in the same writable volume Sencho uses for its database and other persisted state. They are intentionally kept outside the user's compose folder, so the operation works even when a container has chowned its bind-mounted stack directory to root.

Each backup is a flat copy of the compose file Sencho found, plus `.env` and any configured project env files if they exist, plus two markers: a `.timestamp` recording when the backup was taken and a `.checksums` integrity manifest holding a SHA-256 for each backed-up file. There is one backup slot per stack: every protected deploy or update overwrites the previous backup, so the **Rollback** menu always reverts to the configuration that was on disk immediately before the most recent run.

A restore is a faithful revert, not an overlay. Sencho replaces the compose file and `.env` with the backed-up copies and removes any compose variant or `.env` that was added after the backup was taken, so the stack returns to exactly the file set it had before the run. For example, if a deploy switched the stack from `compose.yaml` to `docker-compose.yml` or introduced a new `.env`, a rollback undoes both. Files Sencho does not manage are left untouched.

Before a restore overwrites anything, Sencho re-hashes each backed-up file and compares it against the `.checksums` manifest. If a file no longer matches (for example, a backup truncated by an out-of-disk write), Sencho aborts the restore with a clear error and leaves the stack exactly as it was, rather than copying the corrupt content back over a working configuration.

## Rollback readiness

The **Stack Dossier** includes a **Rollback readiness** panel: a pre-flight read on whether rolling back will actually fix the problem. It carries an overall verdict (**Ready**, **Partial**, or **Not ready**) and evaluates five signals: whether a previous compose file exists and how old it is, whether a previous `.env` was captured, whether the previous image tag is pinned or moving (moving tags are not reverted), the age of the last successful deploy, and whether healthchecks are defined to verify recovery. A sixth, always-shown note covers application data: named volumes and bind-mounted data (database rows, uploaded files, anything outside the compose and env files) are outside the scope of any revert.

<Frame>
  <img src="/images/atomic-deployments/rollback-readiness.png" alt="Rollback readiness panel in the Stack Dossier for the plex stack, showing a Partial verdict badge and five signal rows: Previous compose file (ready), Previous env file (ready), Previous image tag (a moving tag warning naming the rollback target), Last successful deploy (ready), and Healthchecks (missing)." />
</Frame>

Check this panel in the dossier before rolling back a stack that has been running for a while. A rollback reverts only the compose and env files; if the problem is in a volume or in a database migration that already ran, rolling back the compose file alone will not help. See [Stack Dossier](/features/stack-dossier) for the full readout.

## Troubleshooting

<AccordionGroup>
  <Accordion title="The Rollback option is not in the More actions menu">
    Sencho hides the entry whenever a rollback is not possible. The most common reason is that the stack has never been deployed, so no backup file exists yet. Run **Deploy** or **Update** once and the entry will appear.

    The entry is also hidden for users who lack the `stack:deploy` permission. Ask an admin to grant `stack:deploy` through **Settings · Access** if the entry does not appear.
  </Accordion>
  <Accordion title="The deploy succeeded but a service crashed seconds later">
    The health probe is a 3-second window after `docker compose up -d` returns. Crashes after that window are out of scope for atomic rollback, because Sencho cannot tell a late exit apart from a normal restart. The [health gate](/features/health-gated-updates) covers exactly this period: it observes the stack for a configurable window after the update, records a verdict on the stack timeline, and offers a manual rollback when containers do not stay healthy. For ongoing health beyond that, use [Auto-Heal Policies](/features/auto-heal-policies) to restart unhealthy containers automatically and [per-stack alert rules](/features/alerts-notifications#per-stack-alert-rules) to page you when a container exits unexpectedly.
  </Accordion>
  <Accordion title="The deploy progress modal showed 'Rollback failed. Manual intervention may be required'">
    This message means the auto-rollback attempted to restore the backup and re-deploy, but the restore step or the re-deploy itself errored out. The backup files are still at `<DATA_DIR>/backups/<nodeId>/<stack>/`. To recover:

    1. Copy `compose.yaml` (or the variant Sencho backed up), `.env`, and any project env files from `<DATA_DIR>/backups/<nodeId>/<stack>/` back into the stack directory.
    2. Open the stack in the editor and click **Deploy** to re-run with the restored configuration.

    The most common causes are filesystem permissions on the stack directory and a missing image in a private registry that the original deploy could not pull.
  </Accordion>
  <Accordion title="Rollback failed with a 'backup is corrupt (integrity check failed)' error">
    The backup slot holds a file whose contents no longer match the checksum recorded when the backup was taken, usually because the disk filled up or the write was interrupted while the backup was being written. Sencho refuses to copy that file back, so your live stack is left untouched rather than overwritten with corrupt content.

    Edit the compose file or `.env` directly in the editor to the configuration you want, then click **Deploy**. The next protected deploy writes a fresh, verified backup, and **Rollback** works again from that point.
  </Accordion>
  <Accordion title="Rollback ran but the stack still has the broken configuration">
    Sencho keeps a single backup per stack. If you ran two atomic deploys back to back, the second deploy overwrote the first backup with the broken configuration before it failed. **Rollback** then restores that broken configuration, because as far as Sencho is concerned it is the most recent known state.

    To recover, edit the compose file or `.env` directly in the editor, fix the bad change, and click **Deploy**. The next protected deploy will write a fresh backup of the now-good configuration.
  </Accordion>
</AccordionGroup>
