---
title: Quickstart
description: Get Sencho running in under five minutes.
---

## Prerequisites

- Docker and Docker Compose installed on the host
- A directory where your Compose projects live (e.g. `/opt/compose`)

## Run with Docker

```bash
docker run -d \
  --name sencho \
  -p 3000:3000 \
  -v /var/run/docker.sock:/var/run/docker.sock \
  -v /opt/compose:/app/compose \
  -v sencho_data:/app/data \
  -e JWT_SECRET=change-me \
  ghcr.io/ansоcode/sencho:latest
```

Open `http://localhost:3000` in your browser. On first boot you'll be prompted to create an admin account.

<Note>
  Replace `/opt/compose` with the path to your Compose projects directory. Every subdirectory inside it becomes a stack in Sencho.
</Note>

## Next steps

- [Add a remote node](/features/overview) to manage another server from the same dashboard
- Browse your stacks, start/stop services, and tail logs from the dashboard
