---
title: Resources Hub
description: Browse, filter, and clean up Docker images, volumes, networks, and unmanaged containers.
---

The **Resources** tab gives you a full view of everything Docker is storing on your host, broken down by type and ownership.

<Frame>
  <img src="/images/resources/resources-overview.png" alt="Resources Hub showing disk footprint, quick clean panel, and images table" />
</Frame>

## Docker disk footprint

The stacked bar at the top visualises how your Docker disk usage is distributed:

| Segment | Meaning |
|---------|---------|
| **Sencho Managed** (green) | Images used by stacks in your `COMPOSE_DIR` |
| **External Projects** (orange) | Images used by Docker projects outside Sencho |
| **Reclaimable** (gray) | Unused images and dangling layers safe to delete |

Click any segment to automatically filter the tabs below to that category.

## Quick Clean panel

Four prune buttons let you reclaim disk space immediately. By default they operate on **Sencho-managed resources only** — they will not touch external Docker projects.

| Button | What it removes |
|--------|----------------|
| **Prune Unused Images** | Images with no running containers in Sencho stacks |
| **Prune Unused Volumes** | Volumes not attached to any Sencho container |
| **Prune Dead Networks** | Networks not connected to any Sencho container |
| **Purge Unmanaged Containers** | Containers Sencho doesn't recognise (started outside it) |

Each button has a **⋮ More options** menu that lets you target **all Docker resources** instead of Sencho-only. Use this carefully — it can affect other Compose projects running on the same host.

A confirmation dialog appears before any destructive operation, showing a summary of what will be removed.

## Resource tabs

### Images

Lists all Docker images on the host with their ID, repository tag, size, and status.

**Filter buttons:** `All` · `Managed` · `External`

**Status badges:**
- `In Use` + stack name — image is actively used by a running container
- `Unused` — image has no running containers; safe to delete

Click the trash icon on any row to delete an individual image. Sencho will warn you if the image is in use.

### Volumes

Lists all Docker volumes. Columns: name, driver, mount point, size, and managed status.

**Filter buttons:** `All` · `Managed` · `External`

<Warning>
  Deleting a volume is permanent. Any data stored in it will be lost. Always back up important volume data before pruning.
</Warning>

### Networks

Lists all Docker networks. Columns: name, driver, scope (`local`, `global`, `swarm`), and managed status.

**Filter buttons:** `All` · `Managed` · `External` · `System`

System networks (like `bridge`, `host`, `none`) are shown but cannot be deleted.

### Unmanaged

Lists containers running on the host that are not part of any Sencho-managed stack. This includes containers started with `docker run`, or Compose projects outside your `COMPOSE_DIR`.

This view is useful for identifying orphaned containers after a failed deployment or after moving stacks in and out of `COMPOSE_DIR`.
