import { useEffect, useRef, useState, useCallback } from 'react';
import {
  Loader2,
  CheckCircle2,
  AlertCircle,
  AlertTriangle,
  CircleHelp,
  HeartPulse,
  X,
  Minimize2,
  Terminal as TerminalIcon,
} from 'lucide-react';
import { Modal } from '@/components/ui/modal';
import { DialogTitle } from '@/components/ui/dialog';
import { Button } from '@/components/ui/button';
import { StructuredLogRow } from '@/components/log-rendering/StructuredLogRow';
import TerminalComponent from '@/components/Terminal';
import { useDeployFeedback, VERB_LABELS, type HealthGateUiState } from '@/context/DeployFeedbackContext';
import { useDeployFeedbackStyle } from '@/hooks/use-deploy-feedback-style';

const AUTO_CLOSE_SECONDS = 4;

// Warn that an in-flight operation has gone quiet after this much silence. The
// backend idle-output timeout terminates a truly hung step later (default
// ~10min); this earlier heads-up keeps the modal from looking falsely busy.
const STALL_WARN_MS = 75_000;

interface DeployFeedbackModalProps {
  isMinimized: boolean;
  onMinimize: () => void;
}

function formatElapsed(seconds: number): string {
  if (seconds >= 60) {
    const m = Math.floor(seconds / 60);
    const s = seconds % 60;
    return `${m}m ${s}s`;
  }
  return `${seconds}s`;
}

export function DeployFeedbackModal({ isMinimized, onMinimize }: DeployFeedbackModalProps) {
  const { panelState, healthGate, logRows, lastOutputAt, onTerminalReady, onTerminalError, onMessage, onPanelClose } = useDeployFeedback();
  const [style] = useDeployFeedbackStyle();

  const [showRaw, setShowRaw] = useState(false);
  const [elapsedSeconds, setElapsedSeconds] = useState(0);
  const [countdown, setCountdown] = useState(AUTO_CLOSE_SECONDS);
  const [userScrolledUp, setUserScrolledUp] = useState(false);

  const startTimeRef = useRef<number>(0);
  const elapsedIntervalRef = useRef<ReturnType<typeof setInterval> | null>(null);
  const countdownIntervalRef = useRef<ReturnType<typeof setInterval> | null>(null);
  const autoCloseHoveredRef = useRef(false);
  const scrollRef = useRef<HTMLDivElement>(null);

  const { isOpen, stackName, action, status, errorMessage, progressUnavailable } = panelState;

  useEffect(() => {
    if (isOpen) {
      // eslint-disable-next-line react-hooks/set-state-in-effect
      setShowRaw(false);
      // eslint-disable-next-line react-hooks/set-state-in-effect
      setElapsedSeconds(0);
      // eslint-disable-next-line react-hooks/set-state-in-effect
      setCountdown(AUTO_CLOSE_SECONDS);
      // eslint-disable-next-line react-hooks/set-state-in-effect
      setUserScrolledUp(false);
      startTimeRef.current = 0;
    }
  }, [isOpen]);

  useEffect(() => {
    if (isOpen && status !== 'preparing') {
      if (startTimeRef.current === 0) startTimeRef.current = Date.now();
      if (elapsedIntervalRef.current !== null) return;
      elapsedIntervalRef.current = setInterval(() => {
        setElapsedSeconds(Math.floor((Date.now() - startTimeRef.current) / 1000));
      }, 1000);
    } else {
      if (elapsedIntervalRef.current !== null) {
        clearInterval(elapsedIntervalRef.current);
        elapsedIntervalRef.current = null;
      }
    }
    return () => {
      if (elapsedIntervalRef.current !== null) {
        clearInterval(elapsedIntervalRef.current);
        elapsedIntervalRef.current = null;
      }
    };
  }, [isOpen, status]);

  const clearCountdownInterval = useCallback(() => {
    if (countdownIntervalRef.current !== null) {
      clearInterval(countdownIntervalRef.current);
      countdownIntervalRef.current = null;
    }
  }, []);

  const startCountdown = useCallback(() => {
    clearCountdownInterval();
    setCountdown(AUTO_CLOSE_SECONDS);
    let remaining = AUTO_CLOSE_SECONDS;
    countdownIntervalRef.current = setInterval(() => {
      remaining -= 1;
      setCountdown(remaining);
      if (remaining <= 0) {
        clearCountdownInterval();
        if (!autoCloseHoveredRef.current) {
          onPanelClose();
        }
      }
    }, 1000);
  }, [clearCountdownInterval, onPanelClose]);

  // Auto-close only when there is nothing left to watch: success with no gate,
  // or success whose gate passed. An observing gate suspends the countdown; a
  // failed/unknown gate keeps the modal open until the user closes it.
  const gateHoldsOpen = healthGate !== null && healthGate.status !== 'passed';
  // Inline style never auto-closes the modal: the banner owns the lifecycle and
  // a manually opened log should not be yanked mid-read.
  const canAutoClose = status === 'succeeded' && isOpen && !gateHoldsOpen && style === 'modal';
  useEffect(() => {
    if (canAutoClose) {
      // eslint-disable-next-line react-hooks/set-state-in-effect
      startCountdown();
    } else {
      clearCountdownInterval();
    }

    return () => {
      clearCountdownInterval();
    };
  }, [canAutoClose, startCountdown, clearCountdownInterval]);

  useEffect(() => {
    if (!userScrolledUp && scrollRef.current) {
      scrollRef.current.scrollTop = scrollRef.current.scrollHeight;
    }
  }, [logRows.length, userScrolledUp]);

  const handleScroll = useCallback(() => {
    const el = scrollRef.current;
    if (!el) return;
    const distanceFromBottom = el.scrollHeight - el.scrollTop - el.clientHeight;
    setUserScrolledUp(distanceFromBottom > 32);
  }, []);

  const handleMouseEnter = useCallback(() => {
    autoCloseHoveredRef.current = true;
    clearCountdownInterval();
  }, [clearCountdownInterval]);

  const handleMouseLeave = useCallback(() => {
    autoCloseHoveredRef.current = false;
    if (canAutoClose) {
      startCountdown();
    }
  }, [canAutoClose, startCountdown]);

  // In Inline style, closing only hides the modal while the banner is still the
  // surface (running or cleanly done). When the op or its gate failed the banner
  // steps aside for the recovery surface, so there is nothing to return to:
  // closing ends the session (and clears the fallback pill), as Modal style
  // always does.
  const inlineFailed = status === 'failed' || healthGate?.status === 'failed';
  const closeSurface = useCallback(() => {
    if (style === 'inline' && !inlineFailed) onMinimize();
    else onPanelClose();
  }, [style, inlineFailed, onMinimize, onPanelClose]);

  const handleOpenChange = useCallback(
    (open: boolean) => {
      if (!open) closeSurface();
    },
    [closeSurface]
  );

  const isDialogOpen = isOpen && !isMinimized;
  const verbLabel = VERB_LABELS[action];

  // Re-evaluated each second by the elapsed-time interval's re-render. Warns
  // while the operation is still streaming but has produced no output for a
  // while, including the case where no first line ever arrived. Suppressed once
  // the progress stream is unavailable: no more output can arrive, so the modal
  // already shows "Live progress unavailable" and a stall warning would be noise.
  const lastLine = logRows.length > 0 ? logRows[logRows.length - 1].message : null;
  const secondsSinceOutput = lastOutputAt > 0 ? Math.floor((Date.now() - lastOutputAt) / 1000) : 0;
  const stalled = status === 'streaming' && !progressUnavailable && lastOutputAt > 0 && Date.now() - lastOutputAt > STALL_WARN_MS;

  return (
    <Modal
      open={isDialogOpen}
      onOpenChange={handleOpenChange}
      showClose={false}
      className="max-w-[640px] max-h-[70vh] flex flex-col"
    >
      <div
        data-testid="deploy-feedback-modal"
        className="flex flex-col flex-1 min-h-0"
        onMouseEnter={handleMouseEnter}
        onMouseLeave={handleMouseLeave}
      >
        <DialogTitle className="sr-only">
          {verbLabel.present} {stackName}
        </DialogTitle>

        {/* Header */}
        <div className="flex items-center justify-between px-4 py-3 border-b border-glass-border shrink-0">
          <div className="flex items-center gap-2 min-w-0">
            <span className="text-sm font-medium text-foreground shrink-0">
              {verbLabel.present}
            </span>
            <span className="text-sm font-mono text-foreground/80 truncate max-w-[200px]">
              {stackName}
            </span>
            {status !== 'preparing' && elapsedSeconds > 0 && (
              <span className="text-xs font-mono text-muted-foreground shrink-0">
                {formatElapsed(elapsedSeconds)}
              </span>
            )}
          </div>

          <div className="flex items-center gap-2 shrink-0">
            <StatusIndicator
              status={status}
              progressUnavailable={progressUnavailable}
              rowCount={logRows.length}
              errorMessage={errorMessage}
              countdown={countdown}
              showCountdown={canAutoClose}
              gateStatus={healthGate?.status ?? null}
            />
            <Button
              variant="ghost"
              size="icon"
              className="h-7 w-7"
              onClick={onMinimize}
              title="Minimize"
            >
              <Minimize2 className="h-3.5 w-3.5" />
            </Button>
            <Button
              variant="ghost"
              size="icon"
              className="h-7 w-7 hover:bg-destructive/10 hover:text-destructive"
              onClick={closeSurface}
              title="Close"
            >
              <X className="h-3.5 w-3.5" />
            </Button>
          </div>
        </div>

        {/* Post-update health gate status */}
        {status === 'succeeded' && healthGate && (
          <HealthGateBanner gate={healthGate} />
        )}

        {/* Stalled-output warning: in-flight but quiet */}
        {stalled && (
          <div
            data-testid="deploy-feedback-stalled"
            className="flex items-start gap-2 px-4 py-2 border-b border-warning/30 bg-warning/5 shrink-0"
          >
            <AlertTriangle className="h-3.5 w-3.5 mt-0.5 shrink-0 text-warning" />
            <div className="min-w-0 text-xs text-warning">
              <p>
                {lastLine
                  ? `No new output for ${formatElapsed(secondsSinceOutput)}. The operation may be stalled.`
                  : 'No output received yet. The operation may be stalled.'}
              </p>
              {lastLine && (
                <p className="mt-0.5 truncate font-mono text-[11px] text-warning/80" title={lastLine}>
                  {lastLine}
                </p>
              )}
            </div>
          </div>
        )}

        {/* Body */}
        <div
          ref={scrollRef}
          className="flex-1 overflow-y-auto min-h-0"
          onScroll={handleScroll}
        >
          {logRows.length === 0 ? (
            <EmptyBody status={status} progressUnavailable={progressUnavailable} />
          ) : (
            <div className="py-1">
              {logRows.map((row) => (
                <StructuredLogRow key={row.id} row={row} />
              ))}
            </div>
          )}
        </div>

        {/* Modal style owns the live terminal here, always mounted so onMessage
            feeds structured rows even before the user toggles raw view. In Inline
            style the portal owns the single socket, so this modal (opened on
            demand) renders a text view of the captured lines instead, avoiding a
            second socket for the same session. */}
        {style === 'modal' ? (
          <div
            className="border-t border-glass-border shrink-0"
            style={{ height: showRaw ? '200px' : 0, overflow: 'hidden' }}
          >
            <TerminalComponent
              nodeId={panelState.nodeId}
              deploySessionId={panelState.deploySessionId}
              onReady={onTerminalReady}
              onError={onTerminalError}
              onMessage={onMessage}
            />
          </div>
        ) : showRaw ? (
          <div className="border-t border-glass-border shrink-0 h-[200px] overflow-auto bg-well">
            <pre className="px-3 py-2 font-mono text-[11px] leading-[1.4] text-foreground/80 whitespace-pre-wrap break-words">
              {logRows.map((r) => r.raw).join('\n')}
            </pre>
          </div>
        ) : null}

        {/* Footer */}
        <div className="flex items-center justify-between px-4 py-2 border-t border-glass-border shrink-0">
          <Button
            variant="ghost"
            size="sm"
            className="h-7 gap-1.5 text-xs text-muted-foreground hover:text-foreground"
            onClick={() => setShowRaw((prev) => !prev)}
          >
            <TerminalIcon className="h-3.5 w-3.5" />
            {showRaw ? 'Hide raw' : 'Raw output'}
          </Button>

          <div className="flex items-center gap-2">
            <Button
              variant="ghost"
              size="sm"
              className="h-7 gap-1.5 text-xs text-muted-foreground hover:text-foreground"
              onClick={onMinimize}
            >
              <Minimize2 className="h-3.5 w-3.5" />
              Minimize
            </Button>
            <Button
              variant="ghost"
              size="sm"
              className="h-7 gap-1.5 text-xs text-muted-foreground hover:bg-destructive/10 hover:text-destructive"
              onClick={closeSurface}
            >
              <X className="h-3.5 w-3.5" />
              Close
            </Button>
          </div>
        </div>
      </div>
    </Modal>
  );
}

// Re-renders every second via the elapsed-time interval, so the observing
// elapsed count stays live without its own timer.
function HealthGateBanner({ gate }: { gate: HealthGateUiState }) {
  const elapsed = gate.startedAt ? Math.max(0, Math.floor((Date.now() - gate.startedAt) / 1000)) : 0;
  const windowLabel = gate.windowSeconds ? ` of ${gate.windowSeconds}s` : '';

  if (gate.status === 'observing') {
    return (
      <div data-testid="health-gate-banner" data-status="observing" className="flex items-start gap-2 px-4 py-2 border-b border-glass-border bg-card/40 shrink-0">
        <HeartPulse className="h-3.5 w-3.5 mt-0.5 shrink-0 text-brand" />
        <p className="min-w-0 text-xs text-muted-foreground">
          Health gate: observing containers ({elapsed}s{windowLabel}). Closing this panel does not stop the observation.
        </p>
      </div>
    );
  }
  if (gate.status === 'passed') {
    return (
      <div data-testid="health-gate-banner" data-status="passed" className="flex items-start gap-2 px-4 py-2 border-b border-success/30 bg-success/5 shrink-0">
        <CheckCircle2 className="h-3.5 w-3.5 mt-0.5 shrink-0 text-success" />
        <p className="min-w-0 text-xs text-success">
          Health gate passed: containers stayed healthy through the observation window.
        </p>
      </div>
    );
  }
  if (gate.status === 'failed') {
    return (
      <div data-testid="health-gate-banner" data-status="failed" className="flex items-start gap-2 px-4 py-2 border-b border-destructive/30 bg-destructive/5 shrink-0">
        <AlertCircle className="h-3.5 w-3.5 mt-0.5 shrink-0 text-destructive" />
        <p className="min-w-0 text-xs text-destructive">
          Health gate failed{gate.reason ? `: ${gate.reason}` : ''}. Rollback options are available on the stack.
        </p>
      </div>
    );
  }
  return (
    <div data-testid="health-gate-banner" data-status="unknown" className="flex items-start gap-2 px-4 py-2 border-b border-glass-border bg-card/40 shrink-0">
      <CircleHelp className="h-3.5 w-3.5 mt-0.5 shrink-0 text-muted-foreground" />
      <p className="min-w-0 text-xs text-muted-foreground">
        Health gate result is unknown{gate.reason ? `: ${gate.reason}` : ''}. Check the stack's containers directly.
      </p>
    </div>
  );
}

interface StatusIndicatorProps {
  status: 'preparing' | 'streaming' | 'succeeded' | 'failed';
  progressUnavailable: boolean;
  rowCount: number;
  errorMessage?: string;
  countdown: number;
  /** False when auto-close is not eligible: inline style, or while a gate is observing or terminal-unhealthy. */
  showCountdown: boolean;
  /** Active health gate status, or null when no gate was started. */
  gateStatus: 'observing' | 'passed' | 'failed' | 'unknown' | null;
}

function StatusIndicator({ status, progressUnavailable, rowCount, errorMessage, countdown, showCountdown, gateStatus }: StatusIndicatorProps) {
  // While the deploy is still in flight (preparing/streaming) but the progress
  // socket is gone, the deploy keeps running server-side with no live output.
  if (progressUnavailable && (status === 'preparing' || status === 'streaming')) {
    return (
      <div className="flex items-center gap-1.5 text-xs text-muted-foreground">
        <Loader2 className="h-3 w-3 animate-spin text-muted-foreground" />
        <span>Live progress unavailable</span>
      </div>
    );
  }

  if (status === 'preparing') {
    return (
      <div className="flex items-center gap-1.5 text-xs text-muted-foreground">
        <Loader2 className="h-3 w-3 animate-spin text-muted-foreground" />
        <span>Connecting...</span>
      </div>
    );
  }

  if (status === 'streaming') {
    return (
      <div className="flex items-center gap-1.5 text-xs text-muted-foreground">
        <Loader2 className="h-3 w-3 animate-spin text-brand" />
        <span>{rowCount} {rowCount === 1 ? 'line' : 'lines'}</span>
      </div>
    );
  }

  if (status === 'succeeded') {
    // The compose operation finished, but while a health gate is active the
    // verdict is not "succeeded" yet: withhold the green state until the gate
    // passes, and report a failed/unknown gate as the headline result.
    if (gateStatus === 'observing') {
      return (
        <div className="flex items-center gap-1.5 text-xs text-muted-foreground">
          <Loader2 className="h-3 w-3 animate-spin text-brand" />
          <span>Verifying health</span>
        </div>
      );
    }
    if (gateStatus === 'failed') {
      return (
        <div className="flex items-center gap-1.5 text-xs text-destructive">
          <AlertCircle className="h-3 w-3 text-destructive" />
          <span>Health gate failed</span>
        </div>
      );
    }
    if (gateStatus === 'unknown') {
      return (
        <div className="flex items-center gap-1.5 text-xs text-muted-foreground">
          <CircleHelp className="h-3 w-3" />
          <span>Health unknown</span>
        </div>
      );
    }
    return (
      <div className="flex items-center gap-1.5 text-xs text-success">
        <CheckCircle2 className="h-3 w-3 text-success" />
        <span>Succeeded</span>
        {showCountdown && <span className="text-muted-foreground">closes in {countdown}s</span>}
      </div>
    );
  }

  // failed
  return (
    <div className="flex items-center gap-1.5 text-xs text-destructive">
      <AlertCircle className="h-3 w-3 text-destructive" />
      <span
        className="max-w-[200px] truncate"
        title={errorMessage}
      >
        {errorMessage ?? 'Failed'}
      </span>
    </div>
  );
}

interface EmptyBodyProps {
  status: 'preparing' | 'streaming' | 'succeeded' | 'failed';
  progressUnavailable: boolean;
}

function EmptyBody({ status, progressUnavailable }: EmptyBodyProps) {
  if (progressUnavailable && (status === 'preparing' || status === 'streaming')) {
    return (
      <div className="flex items-center justify-center py-10 text-sm text-muted-foreground text-center px-4">
        Live progress is unavailable for this deploy. It continues running in the background.
      </div>
    );
  }

  if (status === 'preparing') {
    return (
      <div className="flex flex-col items-center justify-center gap-2 py-10 text-muted-foreground">
        <Loader2 className="h-5 w-5 animate-spin" />
        <span className="text-sm">Connecting to log stream...</span>
      </div>
    );
  }

  return (
    <div className="flex items-center justify-center py-10 text-sm text-muted-foreground">
      Waiting for output...
    </div>
  );
}
