---
title: "Auto-Update Policies"
description: "Review pending container updates across your fleet, with risk badges, changelogs, and scheduled run times, before applying."
---

<Note>
  Auto-Update is hub-only and is hidden from the nav strip when a remote node is the active selection. See [Multi-Node Management](/features/multi-node#what-top-level-views-show-when-a-remote-node-is-active).
</Note>

## Overview

Auto-Update Policies are the launchpad for every pending update across your stacks. Instead of a list of CRUD policies, the view surfaces one card per stack with an available update and tells you, at a glance, whether it is safe to apply.

Each card shows:

- The current tag and (for semver updates) the next tag, with the new version highlighted in cyan. For digest-only updates, the card shows the current tag with a **Rebuild available** marker instead of a version diff.
- A **risk badge** derived from the version delta: `Safe · patch` (green), `Review · minor` (amber), `Blocked · major` (red), or `Digest rebuild` (gray) for non-semver tags.
- The primary image reference, plus a count of additional services if more than one image in the stack has an update.
- A one-line changelog preview when the registry publishes one. Registries that omit changelog metadata render the card with "No changelog available from the registry yet."
- The next scheduled run for the matching auto-update task, if one exists, or "No schedule".

<Frame>
  <img src="/images/auto-update/readiness-board.png" alt="Readiness board with hero counter, per-node groups, and risk badges" />
</Frame>

The hero at the top counts pending updates across every node in your fleet and tells you how many are ready to apply without human review. Its subtitle reads `X of Y ready to apply automatically across N nodes`. Stacks with a major version bump are surfaced as a separate count (`· Z blocked by major bump`) so they can be reviewed before the scheduler runs.

Cards are grouped by node, with a section header for each node that has at least one pending update. The header shows the node name, a `local` or `remote` pill, and the stack count. The local node is listed first, followed by remote nodes alphabetically. If any of your online nodes is unreachable when the page loads, a small line under the hero reads `X of Y nodes reachable. Unreachable nodes are not shown.`

## Empty state

When nothing is pending, the board renders a single Shield-icon panel with the headline "All stacks on current builds" and the sub-line "Sencho rechecks registries on the configured interval." Image update detection runs on a configurable interval (every 2 hours by default) on each node; the readiness board reflects that cached status until the next check, or until you press **Recheck**. Adjust the interval under **Settings > Automation > Image update checks**.

## Detection cadence

Sencho polls your registries on a set interval to detect available image updates and raise notifications. This detection cadence is configurable under **Settings > Automation > Image update checks**: choose anything from every 15 minutes to once a day. The default is every 2 hours, and changing it takes effect immediately, with no restart.

Detection is separate from applying updates:

- **Registry detection** is this interval. It only looks for newer images and raises an "update available" notification the first time a stack goes from up to date to having an update.
- **Scheduled auto-update tasks** apply updates on their own cron schedule, independent of the detection interval. See [Scheduling auto-updates](#scheduling-auto-updates).
- **Apply now** updates a single stack on demand, regardless of either schedule.

The interval is node-scoped: each node runs its own scanner on its own cadence, and across a fleet Sencho staggers the runs slightly so the nodes do not all poll at the same instant. Setting the interval requires an admin account.

The readiness hero shows this instance's cadence at a glance: when it last checked, when the next check is due, and, right after a manual **Recheck**, how long the 2-minute cooldown has left.

## Workflow

1. Open **Update** from the top nav strip.
2. Skim the card grid. The badge tells you the risk at a glance: `Safe · patch` is green, `Review · minor` is amber, `Blocked · major` is red, and a digest-only rebuild on a non-semver tag shows the gray `Digest rebuild` badge.
3. For a safe update, click **Apply now** on the card to pull and recreate the stack immediately.
4. For a major bump, review the changelog preview and the upstream release notes. **Apply now** is disabled on the readiness board for blocked cards; to apply a major bump after review, use the stack's lifecycle **Update** action (right-click the stack in the sidebar, or open the kebab menu and choose **Update**, or click **Deploy** in the stack editor).
5. Use **Recheck** in the hero to force an immediate registry poll across every reachable node. A 2-minute per-node cooldown applies, and the toast tells you how many nodes were triggered, rate-limited, or failed.

## Risk badges

| Badge | Color | When it appears |
|-------|-------|-----------------|
| `Safe · patch` | Green (Shield icon) | Patch-level semver bump (e.g. `1.2.3` to `1.2.4`) |
| `Review · minor` | Amber (AlertTriangle icon) | Minor semver bump (e.g. `1.2.3` to `1.3.0`) |
| `Blocked · major` | Red (ShieldAlert icon) | Major semver bump (e.g. `1.2.3` to `2.0.0`). **Apply now** is disabled; the card surfaces the reason "Major version jumps require human review before applying." |
| `Digest rebuild` | Gray | Non-semver tag (e.g. `main`, `stable`) with an updated digest |

A separate inline `Rebuild available` label replaces the version diff when only the digest changed (same tag, new image). The risk badge on those cards still reflects the underlying semver classification reported by the registry.

Blocked updates still surface in scheduled check runs so you stay informed, but the apply button is disabled until you review them manually.

## Per-stack control

Auto-update is opt-in per stack. A stack participates in unattended updates only when an enabled scheduled task covers it. To leave a stack out (databases, self-built images, anything pinned to a fixed tag), simply do not create a schedule for it.

- **Per-stack schedule.** Create a **Auto-update Stack** task targeting that stack alone. Only this stack is updated when the cron fires.
- **Fleet-wide schedule.** Create a **Auto-update All Stacks** task targeting a node. Every stack on that node is checked and updated when new images are available. If you do not want every stack covered, create per-stack schedules instead.
- **Stack list dot.** Image-update *detection* runs on the configured interval (every 2 hours by default) regardless of whether any schedule is configured. The sidebar dot and the readiness board still show available updates so you can decide what to do with them.
- **Manual updates are always available.** The lifecycle **Update** action on a stack applies an update on demand, independent of any scheduled task.

## Cleaning up after updates

Every update pulls a fresh image and recreates the affected containers. Once the new image is in place, the image it replaced becomes a dangling (untagged) layer that otherwise lingers on disk until you prune it by hand.

Sencho clears this for you. Under **Settings > Monitoring > Docker & Storage**, the **Prune dangling images after updates** toggle is on by default. When a stack update or a Sencho self-update finishes successfully, Sencho removes the node's dangling (untagged) image layers, including the one the update just orphaned. This is a standard dangling-image prune, so any other untagged layers already on the node are reclaimed in the same pass. Only untagged layers are touched: tagged images (including those for stopped stacks), your volumes, and your data are never removed. Changing the setting requires an admin account.

The toggle is per node. Each Sencho instance honors its own setting, so you can leave cleanup on for your hub and off for a particular remote, or the reverse. Switch the active node and open its settings to set the value for that node.

Turn it off to keep every previous image layer, for example when you roll back by re-tagging an older build. With the toggle off, reclaim space on demand from the [Resources](/features/resources) view or a scheduled prune task instead.

## Scheduling auto-updates

Auto-update is a first-class action in the Schedules view. To create a recurring check for a stack:

1. Open **Schedules** in the top nav.
2. Click **New Schedule**.
3. Set **Action** to **Auto-update Stack**, choose the target node and stack, pick a cron expression, and save.

The task lives alongside restart, prune, snapshot, and scan tasks in the same timeline and table. Run history, notifications, and the Run Now button behave the same as for every other scheduled action. See [Scheduled Operations](/features/scheduled-operations) for details.

## Multi-node support

The readiness board shows pending updates from every node in your fleet in a single view, regardless of which node is selected in the sidebar. You do not need to switch nodes to inspect what is pending elsewhere.

Each node group renders its own card grid under a header showing the node name, a `local` or `remote` pill, and a stack count. **Apply now** runs on the node that owns the stack, and **Recheck** fans out to every reachable node so registries get polled in parallel. Sencho handles the routing through the Distributed API; no additional configuration is needed.

## How readiness is computed

For each stack with a pending image update, Sencho computes a preview by:

1. Parsing the compose file to enumerate every pullable image reference.
2. Calling the registry with your configured credentials to fetch the current tag list and remote digest.
3. Picking the highest semver tag greater than the current tag (keeping the same prefix and suffix). If the highest available tag matches the current one but the remote digest has changed, the card surfaces as a `Rebuild available` update.
4. Scoring the overall stack by the most severe image bump. Any major bump marks the stack as blocked.
5. Normalizing Docker Hub library paths so credentials and changelog lookups resolve correctly.

The preview is recomputed each time the readiness board loads, so it reflects the live state of your registries and local images.

## Troubleshooting

<AccordionGroup>
  <Accordion title='Card shows "No changelog available"'>
    Sencho reads changelog metadata from the registry's manifest and OCI annotations. Registries that do not publish this metadata (most private registries and many self-hosted ones) render the card without a changelog. The risk badge is still accurate because it is computed from the tag itself.
  </Accordion>
  <Accordion title='Apply now is disabled with a "Blocked · major" tooltip'>
    The stack has a major version bump and is blocked on the readiness board by policy: major updates never auto-apply without human review. To apply after reviewing the upstream release notes, use the stack's lifecycle **Update** action from the sidebar kebab or right-click menu, or open the stack editor and click **Deploy**.
  </Accordion>
  <Accordion title='Card stays stuck on "Checking registry..."'>
    The registry call is either still pending or it failed. Click **Recheck** in the hero to retry. If the stack uses private-registry credentials, confirm they are still valid in **Settings > Registries**.
  </Accordion>
  <Accordion title='"Nothing to update" but I see an update on another view'>
    Image update detection runs on the configured interval (every 2 hours by default) on each node, and the readiness board uses the same cached status. Trigger **Recheck** to force a fresh check across every reachable node, or shorten the interval under **Settings > Automation > Image update checks**.
  </Accordion>
  <Accordion title='Scheduled auto-update runs are not applying to a specific stack'>
    No schedule covers that stack. Open **Schedules** in the top nav, create a new **Auto-update Stack** task targeting the stack (or an **Auto-update All Stacks** task on its node), and pick a cron. The next firing will include the stack, or you can trigger an immediate run from the row.
  </Accordion>
  <Accordion title='Banner says "X of Y nodes reachable"'>
    One or more nodes that are marked online in your fleet did not respond within the request timeout. Pending updates from those nodes are not shown until they come back. Check the node's status from the Fleet view and the network path between this Sencho instance and the unreachable node.
  </Accordion>
  <Accordion title='An old image I wanted to keep disappeared after an update'>
    Automatic cleanup removes only dangling (untagged) image layers, the leftovers a pull orphans. Any image that still carries a tag, including images for stopped stacks, is left in place. If you keep a previous build to roll back to, give it a distinct tag so it is never dangling, or turn off **Prune dangling images after updates** under **Settings > Monitoring > Docker & Storage** on that node.
  </Accordion>
  <Accordion title='Disk usage barely changed after an update'>
    Automatic cleanup reclaims dangling (untagged) image layers only. A long-running host accumulates other reclaimable data (stopped containers, unused volumes and networks, build cache) that this toggle does not touch. Run a full prune from the [Resources](/features/resources) view, or schedule a prune task, to reclaim the rest.
  </Accordion>
</AccordionGroup>
