---
title: Fleet View
description: Monitor all your nodes from a single dashboard with real-time health metrics, search, filtering, and container drill-down.
---

The **Fleet** tab gives you a bird's-eye view of every node in your Sencho deployment, local and remote, on one screen. It is available to all tiers, with advanced features unlocked by Skipper and Admiral.

<Frame>
  <img src="/images/fleet-view/fleet-overview.png" alt="Fleet Overview showing health summary cards, toolbar, node cards, and tabs" />
</Frame>

## Page layout

The Fleet page is divided into two tabs:

- **Overview** - the main monitoring view described on this page
- **Snapshots** - fleet-wide backup snapshots (covered in [Fleet Backups](/features/fleet-backups))

The header shows **Fleet Overview** with a subtitle summarising the current state (e.g. "2 of 2 nodes online, 31 containers, 21 stacks"). Two buttons sit in the top-right corner:

| Button | What it does |
|--------|--------------|
| **Check Updates** | Opens the Node Updates modal to view and apply Sencho version updates across your fleet (Skipper+) |
| **Refresh** | Re-fetches data from all nodes. Shows a spinner while loading |

## Community features

Every Sencho installation gets the full fleet monitoring grid at no cost.

### Node grid

Each node appears as a card showing:

| Data | Description |
|------|-------------|
| **Status badge** | Online (green) or Offline (grayed out) |
| **Type badge** | `local` or `remote` |
| **Version badge** | The node's Sencho version (e.g. `v0.38.0`). Remote nodes running older versions that cannot report their version show no version badge |
| **Update available badge** | Orange pill shown when a newer Sencho version is available for this node |
| **Critical badge** | Red pill shown when CPU or disk usage exceeds 90% |
| **Running containers** | Count of containers in `running` state |
| **Stopped containers** | Count of containers in `exited` state |
| **Stacks** | Total number of Compose stacks on the node |
| **CPU usage** | Current percentage with colour-coded bar (green to amber to red) |
| **RAM usage** | Used / total with percentage bar |
| **Disk usage** | Used / total with percentage bar |

Nodes with an available Sencho update also show an **Update to vX.Y.Z** button at the bottom of the card.

Offline nodes are visually dimmed and show a "Node unreachable" placeholder instead of stats.

### Manual refresh

Click the **Refresh** button in the top-right to re-fetch data from all nodes. The button shows a spinner while loading.

---

## Paid features

<Note>
  The features below require a Skipper or Admiral license. Community users see an upgrade prompt in place of these controls.
</Note>

### Fleet health summary cards

Four cards appear above the node grid, aggregating data across all online nodes:

| Card | What it shows |
|------|---------------|
| **Containers** | Total running containers, with fleet-wide total in subtitle |
| **Fleet CPU** | Average CPU across all online nodes, plus which node has the highest load |
| **Fleet Memory** | Total RAM used / total available across the fleet |
| **Alerts** | Count of nodes with critical resource usage (CPU or disk above 90%). Card turns red when any exist |

### Auto-refresh

Fleet data automatically refreshes every 30 seconds. A subtle indicator at the bottom of the page confirms this is active. When a node update is in progress, the refresh rate increases to every 5 seconds so you can watch status changes in near real-time.

### Search

The search bar filters the node grid in real time. It matches against:
- Node names (e.g. typing `dev` shows only nodes with "dev" in the name)
- Stack names (e.g. typing `plex` shows only nodes that have a "plex" stack)

### Sorting

Use the sort dropdown to order nodes by:
- **Name** (alphabetical)
- **CPU Usage** (highest first)
- **Memory Usage** (highest first)
- **Containers** (most first)
- **Status** (online first)

Click the arrow button next to the dropdown to toggle ascending/descending.

Sort preferences are saved to your browser and persist across sessions.

### Filtering

Filter pills let you narrow the grid:

| Filter | Options |
|--------|---------|
| **Status** | All, Online, Offline |
| **Type** | All Types, Local, Remote |
| **Critical Only** | Show only nodes with CPU or disk above 90% |
| **Tags** | Filter by stack labels assigned to nodes |

A "Clear filters" button appears when filters hide all nodes.

### Stack drill-down

Click **Stack details** on any online node card to expand the stack list. The button shows the total stack count (e.g. "18 stacks"). Each stack in the list shows a container count badge.

Click a stack name to expand it further and see individual containers with:
- Container name
- State badge (running, exited, restarting)
- Image name (e.g. `linuxserver/plex:latest`)
- Uptime (e.g. "Up 4 days")

Hover over any container row to reveal an **Open in editor** button that navigates you directly to that stack's editor on the corresponding node.

<Frame>
  <img src="/images/fleet-view/fleet-drill-down.png" alt="Fleet View with Stack details expanded showing the stack list and a container drill-down" />
</Frame>

### Critical node detection

Nodes with CPU or disk usage above 90% automatically receive a red **Critical** badge. Combined with the **Critical Only** filter, this lets you quickly triage overloaded servers.

### Node Updates

Click **Check Updates** in the header to open the Node Updates modal. This lets you manage Sencho version updates across your entire fleet from one place.

<Frame>
  <img src="/images/fleet-view/fleet-node-updates.png" alt="Node Updates modal showing update status for all fleet nodes" />
</Frame>

The modal shows:

- **Summary cards** at the top: counts of nodes that are Up to date, have updates Available, are currently Updating, or have Failed
- **Gateway version** label showing your primary instance's version
- **Filter** search box to find specific nodes
- **Node table** with columns: Node name, Type, Current version, Latest version, and Status (either an "Up to date" badge or an "Update" button)
- **Recheck** button to re-scan for available updates
- **Update All** button to trigger updates on all remote nodes that have a pending update

When you click **Update** on a remote node, Sencho sends the update command and the node restarts with the new version. If you update the local node, a reconnection overlay appears while your primary instance restarts.

---

## How fleet data is fetched

Fleet View queries all registered nodes in parallel. Each node responds independently; one slow or offline node does not block the others. Local node data comes from the Docker socket and system stats directly. Remote node data is fetched over the Distributed API proxy using each node's Bearer token.

<Note>
  Fleet View always runs on your primary (local) Sencho instance. It is never proxied through a remote node.
</Note>
